\hypertarget{struct__ImageStack}{}\section{\+\_\+\+Image\+Stack Struct Reference}
\label{struct__ImageStack}\index{\+\_\+\+Image\+Stack@{\+\_\+\+Image\+Stack}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{struct__ImageStack_ab50cf0f00686a1fbe92fd0cb56abcf5a}\label{struct__ImageStack_ab50cf0f00686a1fbe92fd0cb56abcf5a}} 
Image\+Info $\ast$ {\bfseries image\+\_\+info}
\item 
\mbox{\Hypertarget{struct__ImageStack_a0c7a2a0cf57e2cd52142fb94be2743b5}\label{struct__ImageStack_a0c7a2a0cf57e2cd52142fb94be2743b5}} 
Image $\ast$ {\bfseries image}
\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 113 of file mogrify-\/private.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cristy/\+Image\+Magick-\/7/\+Magick\+Wand/mogrify-\/private.\+h\end{DoxyCompactItemize}
