\hypertarget{struct__Stack}{}\section{\+\_\+\+Stack Struct Reference}
\label{struct__Stack}\index{\+\_\+\+Stack@{\+\_\+\+Stack}}


Collaboration diagram for \+\_\+\+Stack\+:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=167pt]{struct__Stack__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{struct__Stack_a5c774f7b68ab2831b9d3854965900d22}\label{struct__Stack_a5c774f7b68ab2831b9d3854965900d22}} 
struct \hyperlink{struct__Stack}{\+\_\+\+Stack} $\ast$ {\bfseries next}
\item 
\mbox{\Hypertarget{struct__Stack_ab0e4c1419270bd027472c8668fab1672}\label{struct__Stack_ab0e4c1419270bd027472c8668fab1672}} 
void $\ast$ {\bfseries data}
\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 90 of file wandcli-\/private.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cristy/\+Image\+Magick-\/7/\+Magick\+Wand/wandcli-\/private.\+h\end{DoxyCompactItemize}
